Pedestals Calib 8601.1

0

1

450 500 550 Hut 1.4.3

HI gain 567.2 LO gain 464.0

0

1

500 550 600 Hut 1.4.4

HI gain 611.5 LO gain 506.0

0

1

550 600 650 Hut 1.4.5

HI gain 628.3 LO gain 540.8

0

1

500 550 600 Hut 1.4.6

HI gain 580.3 LO gain 535.4

0

1

500 550 600 Hut 1.4.7

HI gain 541.0 LO gain 578.2

0

1

500 550 600 Hut 1.4.8

HI gain 635.5 LO gain 465.5

0

1

400 450 500 Hut 1.5.2

HI gain 444.0 LO gain 471.0

0

1

500 550 600 Hut 1.5.3

HI gain 523.2 LO gain 613.7

0

1

500 550 600

Hut 1.5.4

HI gain 496.8 LO gain 613.5

0

1

550 600 650 Hut 1.5.5

HI gain 552.5 LO gain 603.6

Pedestals Calib 8601.1

0

1

550 600 650 Hut 1.5.6

HI gain 633.5 LO gain 582.9

0

1

550 600 650 Hut 1.5.7

HI gain 619.0 LO gain 587.7

0

1

500 550 600 Hut 1.5.8

HI gain 557.2 LO gain 569.0

0

1

450 500 550 Hut 1.6.2

HI gain 500.0 LO gain 496.4

0

1

400 450 500 Hut 1.6.3

HI gain 395.0 LO gain 468.0

0

1

400 450 500 Hut 1.6.4

HI gain 428.0 LO gain 509.9

0

1

400 450 500 Hut 1.6.5

HI gain 365.5 LO gain 506.2

0

1

450 500 550 Hut 1.6.6

HI gain 455.0 LO gain 503.1

0

1

400 450 500 Hut 1.6.7

HI gain 464.5 LO gain 448.2

0

1

450 500 550 Hut 1.6.8

HI gain 518.0 LO gain 443.4

Pedestals Calib 8601.1

0

1

500 550 600 Hut 1.7.2

HI gain 543.0 LO gain 518.0

0

1

500 550 600 Hut 1.7.3

HI gain 548.0 LO gain 530.8

0

1

700 720 740 Hut 1.7.4

HI gain 550.5 LO gain 497.5

0

1

450 500 550 Hut 1.7.5

HI gain 491.0 LO gain 464.7

0

1

400 450 500 Hut 1.7.6

HI gain 425.0 LO gain 433.2

0

1

350 400 450 Hut 1.7.7

HI gain 377.0 LO gain 401.8

0

1

2

300 350 400 Hut 1.7.8

HI gain 355.0 LO gain 370.7

0

1

450 500 550 Hut 1.8.2

HI gain 519.5 LO gain 440.7

0

1

400 600

Hut 1.8.3

HI gain 547.0 LO gain 607.0

0

1

550 600 650 Hut 1.8.4

HI gain 545.3 LO gain 612.3

Pedestals Calib 8601.1

0

1

450 500 550 Hut 1.8.5

HI gain 459.0 LO gain 572.8

0

1

500 550 600 Hut 1.8.6

HI gain 575.0 LO gain 522.7

0

1

2

700 720 740 Hut 1.8.7

HI gain 511.0 LO gain 513.0

0

1

450 500 550 Hut 1.8.8

HI gain 461.3 LO gain 550.0

0

1

500 550 600 Hut 1.9.2

HI gain 574.7 LO gain 494.1

0

1

450 500 550 Hut 1.9.3

HI gain 556.3 LO gain 469.9

0

1

450 500 550 Hut 1.9.4

HI gain 533.3 LO gain 478.5

0

1

400 450 500 Hut 1.9.5

HI gain 397.7 LO gain 503.2

0

1

450 500 550 Hut 1.9.6

HI gain 509.7 LO gain 484.0

0

1

450 500 550 Hut 1.9.7

HI gain 527.2 LO gain 519.0

Pedestals Calib 8601.1

0

1

450 500 550 Hut 1.9.8

HI gain 372.0 LO gain 603.3

0

1

450 500 550 Hut 1.10.2

HI gain 553.0 LO gain 487.7

0

1

450 500 550 Hut 1.10.3

HI gain 561.3 LO gain 465.7

0

1

400 450 500 Hut 1.10.4

HI gain 571.0 LO gain 340.5

0

1

600 650 700

Hut 1.10.5

HI gain 452.0 LO gain 352.0

0

1

400 450 500 Hut 1.10.6

HI gain 556.7 LO gain 362.0

0

1

450 500 550 Hut 1.10.7

HI gain 590.2 LO gain 372.0

0

1

400 450 500 Hut 1.10.8

HI gain 544.8 LO gain 382.0

0

1

400 450 500 Hut 1.11.3

HI gain 507.6 LO gain 439.5

0

2

400 450 500 Hut 1.11.4

HI gain 466.8 LO gain 390.5

Pedestals Calib 8601.1

0

2

400 450 500 Hut 1.11.5

HI gain 466.7 LO gain 398.0

0

1

500 550 600 Hut 1.11.6

HI gain 716.0 LO gain 405.5

0

1

500 550 600 Hut 1.11.7

HI gain 670.5 LO gain 413.0

0

1

400 450 500 Hut 1.11.8

HI gain 464.0 LO gain 403.0

LP calibrations Calib 8601.1

0

20

40

0 1000 2000 3000 4000

Entries Mean RMS 400 2619. 4.573

Hut 1.4.3 TDC counts

Events

0

20

40

2600 2650 2700

Entries Mean RMS 400 2619. 4.573

Hut 1.4.3

Hut 1.4.3 TDC counts

Events

HImean = 1233.7 LOmean = 3017.4

0 10 20

0 1000 2000 3000 4000

Entries Mean RMS 400 2491. 10.26

Hut 1.4.4 TDC counts

Events

0 10 20

2450 2500 2550

Entries Mean RMS 400 2491. 10.26

Hut 1.4.4

Hut 1.4.4 TDC counts

Events

HImean = 1165.0 LOmean = 3039.7

0

200

400

0 1000 2000 3000 4000

Entries Mean RMS 399 0.5000 0.0000E+00

Hut 1.4.5 TDC counts

Events

0

200

400

0 25 50 75 100

Entries Mean RMS 399 0.5000 0.0000E+00

Hut 1.4.5

Hut 1.4.5 TDC counts

Events

HImean = 1170.6 LOmean = 2944.2

0

20

0 1000 2000 3000 4000

Entries Mean RMS 400 2470. 9.458

Hut 1.4.6 TDC counts

Events

0

20

2450 2500 2550

Entries Mean RMS 400 2470. 9.458

Hut 1.4.6

Hut 1.4.6 TDC counts

Events

HImean = 1168.8 LOmean = 2934.4

0

200

400

0 1000 2000 3000 4000

Entries Mean RMS 399 0.5000 0.0000E+00

Hut 1.4.7 TDC counts

Events

0

200

400

0 25 50 75 100

Entries Mean RMS 399 0.5000 0.0000E+00

Hut 1.4.7

Hut 1.4.7 TDC counts

Events

HImean = 1171.1 LOmean = 2944.8

LP calibrations Calib 8601.1

0 20 40

0 1000 2000 3000 4000

Entries Mean RMS 400 2593. 3.990

Hut 1.4.8 TDC counts

Events

0 20 40

2550 2600 2650

Entries Mean RMS 400 2593. 3.990

Hut 1.4.8

Hut 1.4.8 TDC counts

Events

HImean = 1237.9 LOmean = 3018.6

0

50

0 1000 2000 3000 4000

Entries Mean RMS 400 2562. 4.375

Hut 1.5.2 TDC counts

Events

0

50

2550 2600 2650

Entries Mean RMS 400 2562. 4.375

Hut 1.5.2

Hut 1.5.2 TDC counts

Events

HImean = 1243.4 LOmean = 3025.0

0 10 20

0 1000 2000 3000 4000

Entries Mean RMS 400 2553. 9.858

Hut 1.5.3 TDC counts

Events

0 10 20

2550 2600 2650

Entries Mean RMS 400 2553. 9.858

Hut 1.5.3

Hut 1.5.3 TDC counts

Events

HImean = 1167.7 LOmean = 2942.1

0 10 20

0 1000 2000 3000 4000

Entries Mean RMS 400 2500. 9.728

Hut 1.5.4 TDC counts

Events

0 10 20

2500 2550 2600

Entries Mean RMS 400 2500. 9.728

Hut 1.5.4

Hut 1.5.4 TDC counts

Events

HImean = 1172.0 LOmean = 2950.4

0 10 20

0 1000 2000 3000 4000

Entries Mean RMS 400 2433. 10.000

Hut 1.5.5 TDC counts

Events

0 10 20

2400 2450 2500

Entries Mean RMS 400 2433. 10.000

Hut 1.5.5

Hut 1.5.5 TDC counts

Events

HImean = 1175.7 LOmean = 2956.6

LP calibrations Calib 8601.1

0 10 20

0 1000 2000 3000 4000

Entries Mean RMS 400 2492. 9.868

Hut 1.5.6 TDC counts

Events

0 10 20

2450 2500 2550

Entries Mean RMS 400 2492. 9.868

Hut 1.5.6

Hut 1.5.6 TDC counts

Events

HImean = 1178.4 LOmean = 2960.5

0

10

20

0 1000 2000 3000 4000

Entries Mean RMS 400 2454. 9.910

Hut 1.5.7 TDC counts

Events

0

10

20

2450 2500 2550

Entries Mean RMS 400 2454. 9.910

Hut 1.5.7

Hut 1.5.7 TDC counts

Events

HImean = 1184.4 LOmean = 2962.7

0

10

20

0 1000 2000 3000 4000

Entries Mean RMS 400 2561. 25.03

Hut 1.5.8 TDC counts

Events

0

10

20

2550 2600 2650

Entries Mean RMS 400 2561. 25.03

Hut 1.5.8

Hut 1.5.8 TDC counts

Events

HImean = 1192.5 LOmean = 2965.0

0

10

20

0 1000 2000 3000 4000

Entries Mean RMS 400 2519. 9.983

Hut 1.6.2 TDC counts

Events

0

10

20

2500 2550 2600

Entries Mean RMS 400 2519. 9.983

Hut 1.6.2

Hut 1.6.2 TDC counts

Events

HImean = 1197.0 LOmean = 2966.0

0

10

20

0 1000 2000 3000 4000

Entries Mean RMS 400 2566. 9.756

Hut 1.6.3 TDC counts

Events

0

10

20

2550 2600 2650

Entries Mean RMS 400 2566. 9.756

Hut 1.6.3

Hut 1.6.3 TDC counts

Events

HImean = 1200.3 LOmean = 2966.3

LP calibrations Calib 8601.1

0 10 20

0 1000 2000 3000 4000

Entries Mean RMS 400 2527. 10.23

Hut 1.6.4 TDC counts

Events

0 10 20

2500 2550 2600

Entries Mean RMS 400 2527. 10.23

Hut 1.6.4

Hut 1.6.4 TDC counts

Events

HImean = 1202.9 LOmean = 2967.4

0 10 20

0 1000 2000 3000 4000

Entries Mean RMS 400 2488. 11.63

Hut 1.6.5 TDC counts

Events

0 10 20

2450 2500 2550

Entries Mean RMS 400 2488. 11.63

Hut 1.6.5

Hut 1.6.5 TDC counts

Events

HImean = 1205.5 LOmean = 2968.2

0

20

40

0 1000 2000 3000 4000

Entries Mean RMS 400 2627. 9.308

Hut 1.6.6 TDC counts

Events

0

20

40

2600 2650 2700

Entries Mean RMS 400 2627. 9.308

Hut 1.6.6

Hut 1.6.6 TDC counts

Events

HImean = 1211.2 LOmean = 2969.2

0

20

0 1000 2000 3000 4000

Entries Mean RMS 400 2551. 9.585

Hut 1.6.7 TDC counts

Events

0

20

2550 2600 2650

Entries Mean RMS 400 2551. 9.585

Hut 1.6.7

Hut 1.6.7 TDC counts

Events

HImean = 1213.3 LOmean = 2968.6

0 10 20

0 1000 2000 3000 4000

Entries Mean RMS 400 2376. 28.44

Hut 1.6.8 TDC counts

Events

0 10 20

2350 2400 2450

Entries Mean RMS 400 2376. 28.44

Hut 1.6.8

Hut 1.6.8 TDC counts

Events

HImean = 1214.9 LOmean = 2968.1

LP calibrations Calib 8601.1

0

20

0 1000 2000 3000 4000

Entries Mean RMS 400 2336. 10.14

Hut 1.7.2 TDC counts

Events

0

20

2300 2350 2400

Entries Mean RMS 400 2336. 10.14

Hut 1.7.2

Hut 1.7.2 TDC counts

Events

HImean = 1220.6 LOmean = 2969.4

0

20

0 1000 2000 3000 4000

Entries Mean RMS 400 2385. 10.51

Hut 1.7.3 TDC counts

Events

0

20

2350 2400 2450

Entries Mean RMS 400 2385. 10.51

Hut 1.7.3

Hut 1.7.3 TDC counts

Events

HImean = 1222.3 LOmean = 2970.1

0

10

20

0 1000 2000 3000 4000

Entries Mean RMS 400 2334. 10.07

Hut 1.7.4 TDC counts

Events

0

10

20

2300 2350 2400

Entries Mean RMS 400 2334. 10.07

Hut 1.7.4

Hut 1.7.4 TDC counts

Events

HImean = 1219.1 LOmean = 2969.9

0

20

0 1000 2000 3000 4000

Entries Mean RMS 400 2338. 10.14

Hut 1.7.5 TDC counts

Events

0

20

2300 2350 2400

Entries Mean RMS 400 2338. 10.14

Hut 1.7.5

Hut 1.7.5 TDC counts

Events

HImean = 1223.3 LOmean = 2969.8

0

10

20

0 1000 2000 3000 4000

Entries Mean RMS 400 2285. 10.14

Hut 1.7.6 TDC counts

Events

0

10

20

2250 2300 2350

Entries Mean RMS 400 2285. 10.14

Hut 1.7.6

Hut 1.7.6 TDC counts

Events

HImean = 1225.0 LOmean = 2970.1

LP calibrations Calib 8601.1

0

20

0 1000 2000 3000 4000

Entries Mean RMS 400 2327. 9.702

Hut 1.7.7 TDC counts

Events

0

20

2300 2350 2400

Entries Mean RMS 400 2327. 9.702

Hut 1.7.7

Hut 1.7.7 TDC counts

Events

HImean = 1224.5 LOmean = 2970.4

0 10 20

0 1000 2000 3000 4000

Entries Mean RMS 400 2434. 10.18

Hut 1.7.8 TDC counts

Events

0 10 20

2400 2450 2500

Entries Mean RMS 400 2434. 10.18

Hut 1.7.8

Hut 1.7.8 TDC counts

Events

HImean = 1224.3 LOmean = 2970.6

0

20

0 1000 2000 3000 4000

Entries Mean RMS 400 2417. 10.24

Hut 1.8.2 TDC counts

Events

0

20

2400 2450 2500

Entries Mean RMS 400 2417. 10.24

Hut 1.8.2

Hut 1.8.2 TDC counts

Events

HImean = 1228.9 LOmean = 2973.0

0 10 20

0 1000 2000 3000 4000

Entries Mean RMS 400 2446. 10.17

Hut 1.8.3 TDC counts

Events

0 10 20

2400 2450 2500

Entries Mean RMS 400 2446. 10.17

Hut 1.8.3

Hut 1.8.3 TDC counts

Events

HImean = 1227.5 LOmean = 2975.0

0

10

20

0 1000 2000 3000 4000

Entries Mean RMS 400 2328. 10.24

Hut 1.8.4 TDC counts

Events

0

10

20

2300 2350 2400

Entries Mean RMS 400 2328. 10.24

Hut 1.8.4

Hut 1.8.4 TDC counts

Events

HImean = 1225.2 LOmean = 2977.4

LP calibrations Calib 8601.1

0

10

20

0 1000 2000 3000 4000

Entries Mean RMS 400 2404. 94.21

Hut 1.8.5 TDC counts

Events

0

10

20

2400 2450 2500

Entries Mean RMS 400 2404. 94.21

Hut 1.8.5

Hut 1.8.5 TDC counts

Events

HImean = 1229.0 LOmean = 2979.6

0 10 20

0 1000 2000 3000 4000

Entries Mean RMS 400 2338. 10.03

Hut 1.8.6 TDC counts

Events

0 10 20

2300 2350 2400

Entries Mean RMS 400 2338. 10.03

Hut 1.8.6

Hut 1.8.6 TDC counts

Events

HImean = 1230.3 LOmean = 2981.8

0

20

0 1000 2000 3000 4000

Entries Mean RMS 400 2457. 10.29

Hut 1.8.7 TDC counts

Events

0

20

2450 2500 2550

Entries Mean RMS 400 2457. 10.29

Hut 1.8.7

Hut 1.8.7 TDC counts

Events

HImean = 1229.0 LOmean = 2983.7

0

10

20

0 1000 2000 3000 4000

Entries Mean RMS 400 2404. 10.64

Hut 1.8.8 TDC counts

Events

0

10

20

2400 2450 2500

Entries Mean RMS 400 2404. 10.64

Hut 1.8.8

Hut 1.8.8 TDC counts

Events

HImean = 1231.8 LOmean = 2985.2

0 10 20

0 1000 2000 3000 4000

Entries Mean RMS 400 2399. 10.39

Hut 1.9.2 TDC counts

Events

0 10 20

2400 2450 2500

Entries Mean RMS 400 2399. 10.39

Hut 1.9.2

Hut 1.9.2 TDC counts

Events

HImean = 1237.2 LOmean = 2986.9

LP calibrations Calib 8601.1

0

20

0 1000 2000 3000 4000

Entries Mean RMS 400 2371. 9.962

Hut 1.9.3 TDC counts

Events

0

20

2350 2400 2450

Entries Mean RMS 400 2371. 9.962

Hut 1.9.3

Hut 1.9.3 TDC counts

Events

HImean = 1236.7 LOmean = 2988.0

0 10 20

0 1000 2000 3000 4000

Entries Mean RMS 400 2465. 10.50

Hut 1.9.4 TDC counts

Events

0 10 20

2450 2500 2550

Entries Mean RMS 400 2465. 10.50

Hut 1.9.4

Hut 1.9.4 TDC counts

Events

HImean = 1233.0 LOmean = 2989.9

0

10

20

0 1000 2000 3000 4000

Entries Mean RMS 400 2401. 10.50

Hut 1.9.5 TDC counts

Events

0

10

20

2400 2450 2500

Entries Mean RMS 400 2401. 10.50

Hut 1.9.5

Hut 1.9.5 TDC counts

Events

HImean = 1234.3 LOmean = 2992.2

0

10

20

0 1000 2000 3000 4000

Entries Mean RMS 400 2438. 9.904

Hut 1.9.6 TDC counts

Events

0

10

20

2400 2450 2500

Entries Mean RMS 400 2438. 9.904

Hut 1.9.6

Hut 1.9.6 TDC counts

Events

HImean = 1235.2 LOmean = 2995.6

0 10 20

0 1000 2000 3000 4000

Entries Mean RMS 400 2400. 10.05

Hut 1.9.7 TDC counts

Events

0 10 20

2400 2450 2500

Entries Mean RMS 400 2400. 10.05

Hut 1.9.7

Hut 1.9.7 TDC counts

Events

HImean = 1232.4 LOmean = 2999.3

LP calibrations Calib 8601.1

0

10

20

0 1000 2000 3000 4000

Entries Mean RMS 400 2276. 10.21

Hut 1.9.8 TDC counts

Events

0

10

20

2250 2300 2350

Entries Mean RMS 400 2276. 10.21

Hut 1.9.8

Hut 1.9.8 TDC counts

Events

HImean = 1232.8 LOmean = 3002.7

0 25 50

0 1000 2000 3000 4000

Entries Mean RMS 400 2691. 3.437

Hut 1.10.2 TDC counts

Events

0 25 50

2650 2700 2750

Entries Mean RMS 400 2691. 3.437

Hut 1.10.2

Hut 1.10.2 TDC counts

Events

HImean = 1262.7 LOmean = 3032.8

0 10 20

0 1000 2000 3000 4000

Entries Mean RMS 400 2461. 10.18

Hut 1.10.3 TDC counts

Events

0 10 20

2450 2500 2550

Entries Mean RMS 400 2461. 10.18

Hut 1.10.3

Hut 1.10.3 TDC counts

Events

HImean = 1233.1 LOmean = 3007.4

0

10

20

0 1000 2000 3000 4000

Entries Mean RMS 400 2408. 10.35

Hut 1.10.4 TDC counts

Events

0

10

20

2400 2450 2500

Entries Mean RMS 400 2408. 10.35

Hut 1.10.4

Hut 1.10.4 TDC counts

Events

HImean = 1231.5 LOmean = 3009.2

0

20

0 1000 2000 3000 4000

Entries Mean RMS 400 2423. 10.09

Hut 1.10.5 TDC counts

Events

0

20

2400 2450 2500

Entries Mean RMS 400 2423. 10.09

Hut 1.10.5

Hut 1.10.5 TDC counts

Events

HImean = 1229.1 LOmean = 3011.3

LP calibrations Calib 8601.1

0

20

40

0 1000 2000 3000 4000

Entries Mean RMS 400 2418. 10.19

Hut 1.10.6 TDC counts

Events

0

20

40

2400 2450 2500

Entries Mean RMS 400 2418. 10.19

Hut 1.10.6

Hut 1.10.6 TDC counts

Events

HImean = 1230.4 LOmean = 3012.9

0 10 20

0 1000 2000 3000 4000

Entries Mean RMS 400 2448. 10.53

Hut 1.10.7 TDC counts

Events

0 10 20

2400 2450 2500 2550

Entries Mean RMS 400 2448. 10.53

Hut 1.10.7

Hut 1.10.7 TDC counts

Events

HImean = 1231.6 LOmean = 3013.6

0

10

20

0 1000 2000 3000 4000

Entries Mean RMS 400 2464. 10.38

Hut 1.10.8 TDC counts

Events

0

10

20

2450 2500 2550

Entries Mean RMS 400 2464. 10.38

Hut 1.10.8

Hut 1.10.8 TDC counts

Events

HImean = 1232.2 LOmean = 3014.2

0

20

0 1000 2000 3000 4000

Entries Mean RMS 400 2148. 26.61

Hut 1.11.3 TDC counts

Events

0

20

2100 2150 2200

Entries Mean RMS 400 2148. 26.61

Hut 1.11.3

Hut 1.11.3 TDC counts

Events

HImean = 1254.7 LOmean = 3039.7

0 25 50

0 1000 2000 3000 4000

Entries Mean RMS 400 2706. 3.764

Hut 1.11.4 TDC counts

Events

0 25 50

2700 2750 2800

Entries Mean RMS 400 2706. 3.764

Hut 1.11.4

Hut 1.11.4 TDC counts

Events

HImean = 1867.5 LOmean = 3014.8

LP calibrations Calib 8601.1

0 25 50

0 1000 2000 3000 4000

Entries Mean RMS 400 2675. 3.125

Hut 1.11.5 TDC counts

Events

0 25 50

2650 2700 2750

Entries Mean RMS 400 2675. 3.125

Hut 1.11.5

Hut 1.11.5 TDC counts

Events

HImean = 1867.3 LOmean = 3015.5

0 10 20

0 1000 2000 3000 4000

Entries Mean RMS 400 2267. 9.457

Hut 1.11.6 TDC counts

Events

0 10 20

2250 2300 2350

Entries Mean RMS 400 2267. 9.457

Hut 1.11.6

Hut 1.11.6 TDC counts

Events

HImean = 1168.5 LOmean = 3016.6

0

20

0 1000 2000 3000 4000

Entries Mean RMS 400 2496. 10.53

Hut 1.11.7 TDC counts

Events

0

20

2450 2500 2550 2600

Entries Mean RMS 400 2496. 10.53

Hut 1.11.7

Hut 1.11.7 TDC counts

Events

HImean = 1166.3 LOmean = 3016.8

0

200

400

0 1000 2000 3000 4000

Entries Mean RMS 399 0.5000 0.0000E+00

Hut 1.11.8 TDC counts

Events

0

200

400

0 25 50 75 100

Entries Mean RMS 399 0.5000 0.0000E+00

Hut 1.11.8

Hut 1.11.8 TDC counts

Events

HImean = 1257.6 LOmean = 3047.7

TDC calibrations Calib 8601.1

0 2000

4000

10 20 30

514.1 / 12 P1 -1402. P2 170.7

icalid

(TDC counts)

Hut 1.4.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.4.3

Hut 1.4.3 icalid

Δfit (TDC counts)

0.14645 ns/TDCcount

0

2000

4000

10 20 30

711.2 / 13 P1 -1616. P2 169.5

icalid

(TDC counts)

Hut 1.4.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.4.4

Hut 1.4.4 icalid

Δfit (TDC counts)

0.14752 ns/TDCcount

0

2000

4000

10 20 30

979.0 / 13 P1 -1639. P2 169.9

icalid

(TDC counts)

Hut 1.4.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.4.5

Hut 1.4.5 icalid

Δfit (TDC counts)

0.147181 ns/TDCcount

0

2000

4000

10 20 30

1146. / 13 P1 -1639. P2 170.5

icalid

(TDC counts)

Hut 1.4.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.4.6

Hut 1.4.6 icalid

Δfit (TDC counts)

0.146626 ns/TDCcount

0

2000

4000

10 20 30

803.4 / 13 P1 -1593. P2 169.6

icalid

(TDC counts)

Hut 1.4.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.4.7

Hut 1.4.7 icalid

Δfit (TDC counts)

0.147396 ns/TDCcount

TDC calibrations Calib 8601.1

0 2000

4000

10 20 30

878.9 / 12 P1 -1456. P2 171.5

icalid

(TDC counts)

Hut 1.4.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.4.8

Hut 1.4.8 icalid

Δfit (TDC counts)

0.145742 ns/TDCcount

0 2000

4000

10 20 30

1267. / 13 P1 -1487. P2 172.1

icalid

(TDC counts)

Hut 1.5.2

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.5.2

Hut 1.5.2 icalid

Δfit (TDC counts)

0.145236 ns/TDCcount

0

2000

4000

10 20 30

1093. / 13 P1 -1571. P2 169.2

icalid

(TDC counts)

Hut 1.5.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.5.3

Hut 1.5.3 icalid

Δfit (TDC counts)

0.147727 ns/TDCcount

0

2000

4000

10 20 30

771.8 / 13 P1 -1602. P2 169.5

icalid

(TDC counts)

Hut 1.5.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.5.4

Hut 1.5.4 icalid

Δfit (TDC counts)

0.147534 ns/TDCcount

0

2000

4000

10 20 30

619.8 / 13 P1 -1577. P2 168.8

icalid

(TDC counts)

Hut 1.5.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.5.5

Hut 1.5.5 icalid

Δfit (TDC counts)

0.148067 ns/TDCcount

TDC calibrations Calib 8601.1

0

2000

4000

10 20 30

530.6 / 13 P1 -1577. P2 168.3

icalid

(TDC counts)

Hut 1.5.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.5.6

Hut 1.5.6 icalid

Δfit (TDC counts)

0.14855 ns/TDCcount

0

2000

4000

10 20 30

798.4 / 13 P1 -1605. P2 169.6

icalid

(TDC counts)

Hut 1.5.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.5.7

Hut 1.5.7 icalid

Δfit (TDC counts)

0.147426 ns/TDCcount

0

2000

4000

10 20 30

914.1 / 13 P1 -1593. P2 169.7

icalid

(TDC counts)

Hut 1.5.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.5.8

Hut 1.5.8 icalid

Δfit (TDC counts)

0.14732 ns/TDCcount

0

2000

4000

10 20 30

1290. / 13 P1 -1629. P2 170.1

icalid

(TDC counts)

Hut 1.6.2

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.6.2

Hut 1.6.2 icalid

Δfit (TDC counts)

0.146939 ns/TDCcount

0

2000

4000

10 20 30

1118. / 13 P1 -1644. P2 170.3

icalid

(TDC counts)

Hut 1.6.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.6.3

Hut 1.6.3 icalid

Δfit (TDC counts)

0.146802 ns/TDCcount

TDC calibrations Calib 8601.1

0

2000

4000

10 20 30

1526. / 13 P1 -1672. P2 171.1

icalid

(TDC counts)

Hut 1.6.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.6.4

Hut 1.6.4 icalid

Δfit (TDC counts)

0.146084 ns/TDCcount

0

2000

4000

10 20 30

875.6 / 13 P1 -1604. P2 170.0

icalid

(TDC counts)

Hut 1.6.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.6.5

Hut 1.6.5 icalid

Δfit (TDC counts)

0.147049 ns/TDCcount

0

2000

4000

10 20 30

893.3 / 13 P1 -1639. P2 169.8

icalid

(TDC counts)

Hut 1.6.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.6.6

Hut 1.6.6 icalid

Δfit (TDC counts)

0.147194 ns/TDCcount

0

2000

4000

10 20 30

962.3 / 13 P1 -1670. P2 170.3

icalid

(TDC counts)

Hut 1.6.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.6.7

Hut 1.6.7 icalid

Δfit (TDC counts)

0.14682 ns/TDCcount

0

2000

4000

10 20 30

600.0 / 13 P1 -1606. P2 169.2

icalid

(TDC counts)

Hut 1.6.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.6.8

Hut 1.6.8 icalid

Δfit (TDC counts)

0.147766 ns/TDCcount

TDC calibrations Calib 8601.1

0

2000

4000

10 20 30

606.1 / 13 P1 -1582. P2 169.1

icalid

(TDC counts)

Hut 1.7.2

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.7.2

Hut 1.7.2 icalid

Δfit (TDC counts)

0.147861 ns/TDCcount

0

2000

4000

10 20 30

659.2 / 13 P1 -1605. P2 169.3

icalid

(TDC counts)

Hut 1.7.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.7.3

Hut 1.7.3 icalid

Δfit (TDC counts)

0.147704 ns/TDCcount

0

2000

4000

10 20 30

839.9 / 13 P1 -1646. P2 169.9

icalid

(TDC counts)

Hut 1.7.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.7.4

Hut 1.7.4 icalid

Δfit (TDC counts)

0.147131 ns/TDCcount

0

2000

4000

10 20 30

664.3 / 13 P1 -1648. P2 169.7

icalid

(TDC counts)

Hut 1.7.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.7.5

Hut 1.7.5 icalid

Δfit (TDC counts)

0.147291 ns/TDCcount

0

2000

4000

10 20 30

657.7 / 13 P1 -1654. P2 169.6

icalid

(TDC counts)

Hut 1.7.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.7.6

Hut 1.7.6 icalid

Δfit (TDC counts)

0.147405 ns/TDCcount

TDC calibrations Calib 8601.1

0

2000

4000

10 20 30

817.9 / 13 P1 -1661. P2 170.4

icalid

(TDC counts)

Hut 1.7.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.7.7

Hut 1.7.7 icalid

Δfit (TDC counts)

0.146745 ns/TDCcount

0

2000

4000

10 20 30

1175. / 13 P1 -1634. P2 170.8

icalid

(TDC counts)

Hut 1.7.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.7.8

Hut 1.7.8 icalid

Δfit (TDC counts)

0.146379 ns/TDCcount

0

2000

4000

10 20 30

960.7 / 13 P1 -1636. P2 170.2

icalid

(TDC counts)

Hut 1.8.2

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.8.2

Hut 1.8.2 icalid

Δfit (TDC counts)

0.146868 ns/TDCcount

0

2000

4000

10 20 30

908.6 / 13 P1 -1613. P2 170.2

icalid

(TDC counts)

Hut 1.8.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.8.3

Hut 1.8.3 icalid

Δfit (TDC counts)

0.146857 ns/TDCcount

0

2000

4000

10 20 30

559.6 / 13 P1 -1624. P2 170.0

icalid

(TDC counts)

Hut 1.8.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.8.4

Hut 1.8.4 icalid

Δfit (TDC counts)

0.147061 ns/TDCcount

TDC calibrations Calib 8601.1

0

2000

4000

10 20 30

755.4 / 13 P1 -1563. P2 168.6

icalid

(TDC counts)

Hut 1.8.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.8.5

Hut 1.8.5 icalid

Δfit (TDC counts)

0.148296 ns/TDCcount

0

2000

4000

10 20 30

477.9 / 13 P1 -1557. P2 168.6

icalid

(TDC counts)

Hut 1.8.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.8.6

Hut 1.8.6 icalid

Δfit (TDC counts)

0.14832 ns/TDCcount

0

2000

4000

10 20 30

371.4 / 13 P1 -1569. P2 168.7

icalid

(TDC counts)

Hut 1.8.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.8.7

Hut 1.8.7 icalid

Δfit (TDC counts)

0.148189 ns/TDCcount

0

2000

4000

10 20 30

423.9 / 13 P1 -1615. P2 169.1

icalid

(TDC counts)

Hut 1.8.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.8.8

Hut 1.8.8 icalid

Δfit (TDC counts)

0.147862 ns/TDCcount

0

2000

4000

10 20 30

599.0 / 13 P1 -1647. P2 169.6

icalid

(TDC counts)

Hut 1.9.2

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.9.2

Hut 1.9.2 icalid

Δfit (TDC counts)

0.147446 ns/TDCcount

TDC calibrations Calib 8601.1

0

2000

4000

10 20 30

425.9 / 13 P1 -1630. P2 169.0

icalid

(TDC counts)

Hut 1.9.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.9.3

Hut 1.9.3 icalid

Δfit (TDC counts)

0.147955 ns/TDCcount

0

2000

4000

10 20 30

531.1 / 13 P1 -1582. P2 169.3

icalid

(TDC counts)

Hut 1.9.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.9.4

Hut 1.9.4 icalid

Δfit (TDC counts)

0.147665 ns/TDCcount

0

2000

4000

10 20 30

550.9 / 13 P1 -1586. P2 169.2

icalid

(TDC counts)

Hut 1.9.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.9.5

Hut 1.9.5 icalid

Δfit (TDC counts)

0.147716 ns/TDCcount

0

2000

4000

10 20 30

516.2 / 13 P1 -1597. P2 169.2

icalid

(TDC counts)

Hut 1.9.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.9.6

Hut 1.9.6 icalid

Δfit (TDC counts)

0.147734 ns/TDCcount

0

2000

4000

10 20 30

391.7 / 13 P1 -1601. P2 168.5

icalid

(TDC counts)

Hut 1.9.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.9.7

Hut 1.9.7 icalid

Δfit (TDC counts)

0.148398 ns/TDCcount

TDC calibrations Calib 8601.1

0

2000

4000

10 20 30

413.0 / 13 P1 -1576. P2 168.9

icalid

(TDC counts)

Hut 1.9.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.9.8

Hut 1.9.8 icalid

Δfit (TDC counts)

0.148003 ns/TDCcount

0 2000

4000

10 20 30

1023. / 13 P1 -1501. P2 171.4

icalid

(TDC counts)

Hut 1.10.2

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.10.2

Hut 1.10.2 icalid

Δfit (TDC counts)

0.145853 ns/TDCcount

0

2000

4000

10 20 30

331.4 / 13 P1 -1556. P2 168.3

icalid

(TDC counts)

Hut 1.10.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.10.3

Hut 1.10.3 icalid

Δfit (TDC counts)

0.1485 ns/TDCcount

0

2000

4000

10 20 30

0.1703E+07/ 14 P1 -831.3 P2 132.4

icalid

(TDC counts)

Hut 1.10.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.10.4

Hut 1.10.4 icalid

Δfit (TDC counts)

0.18877 ns/TDCcount

0

2000

4000

10 20 30

249.5 / 13 P1 -1560. P2 167.6

icalid

(TDC counts)

Hut 1.10.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.10.5

Hut 1.10.5 icalid

Δfit (TDC counts)

0.149141 ns/TDCcount

TDC calibrations Calib 8601.1

0

2000

4000

10 20 30

422.0 / 13 P1 -1564. P2 168.4

icalid

(TDC counts)

Hut 1.10.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.10.6

Hut 1.10.6 icalid

Δfit (TDC counts)

0.148445 ns/TDCcount

0

2000

4000

10 20 30

454.7 / 12 P1 -1535. P2 168.4

icalid

(TDC counts)

Hut 1.10.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.10.7

Hut 1.10.7 icalid

Δfit (TDC counts)

0.148436 ns/TDCcount

0

2000

4000

10 20 30

650.8 / 12 P1 -1549. P2 169.3

icalid

(TDC counts)

Hut 1.10.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.10.8

Hut 1.10.8 icalid

Δfit (TDC counts)

0.147631 ns/TDCcount

0 2000

4000

10 20 30

1376. / 13 P1 -1544. P2 172.0

icalid

(TDC counts)

Hut 1.11.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.11.3

Hut 1.11.3 icalid

Δfit (TDC counts)

0.145388 ns/TDCcount

0 2000

4000

10 20 30

365.8 / 13 P1 -1491. P2 169.5

icalid

(TDC counts)

Hut 1.11.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.11.4

Hut 1.11.4 icalid

Δfit (TDC counts)

0.147505 ns/TDCcount

TDC calibrations Calib 8601.1

0 2000

4000

10 20 30

435.8 / 13 P1 -1492. P2 169.4

icalid

(TDC counts)

Hut 1.11.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.11.5

Hut 1.11.5 icalid

Δfit (TDC counts)

0.147545 ns/TDCcount

0

2000

4000

10 20 30

1029. / 13 P1 -1683. P2 170.2

icalid

(TDC counts)

Hut 1.11.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.11.6

Hut 1.11.6 icalid

Δfit (TDC counts)

0.146864 ns/TDCcount

0

2000

4000

10 20 30

1164. / 13 P1 -1670. P2 170.6

icalid

(TDC counts)

Hut 1.11.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.11.7

Hut 1.11.7 icalid

Δfit (TDC counts)

0.146535 ns/TDCcount

-1

0

1

10 20 30 icalid

(TDC counts)

Hut 1.11.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.11.8

Hut 1.11.8 icalid

Δfit (TDC counts)

0 ns/TDCcount